0

10

20

30

40

50

Cells with DCF fluorescence (%)

OGD Deep hypothermia Moderate hypothermia Mild hypothermia *** ** **

0

1

2

3

Red/Green fluorescence (% of OGD�

OGD Deep hypothermia Moderate hypothermia Mild hypothermia *** ** *

T2 T3 1h 3h 6h 8h 10h 12h 18h 24h 0.0

0.1

0.2

0.3

0.4

0.5

OD405nm

OGD

Deep hypothermia

Moderate hypothermia

Mild hypothermia

**

** **

T2 T3 2h 4h 8h 10h 12h 16h 18h 24h 0.0

0.2

0.4

0.6

OD405nm

OGD

Deep hypothermia

Moderate hypothermia

Mild hypothermia

**

***

Reactive Oxygen Species Assay Mitochondrial membrane potential

Caspase-8 Activity Assay Caspase-3 Activity Assay

A B

C D