0h 3h 6h 12h 14h 16h 18h 20h 24h

0

20

40

60 OGD (16 h)

Apoptosis rate (%)

Normal

OGD (8 h)

OGD (12 h) ***

A B

OGD exposure times Reoxygenation times

Normal 1h 2h 4h 8h 12h 16h

0

20

40

60

80

100

120

Relative cell viability (% Normal)

* *** *** ***