10

15

20

25

30

35

40

Temperature (^oC)

Cooling Rewarming

T1 T2

T3

37^oC (24 h 37^oC)

Deep hypothermia

Mild hypothermia

Moderate hypothermia

OGD: 95% N_2, 5% CO_2 without glucose

Maintaining

34^oC 31^oC

17^oC