B A

-6 -4 -2 0 0

1

2

log (D_t) a

0.0 0.2 0.4 0.6 0.8 1.0

0.0 0.5 1.0 1.5 2.0 2.5

0.00

0.02

0.04

0.06

0.08

MSD ( m^2/s)

(s)

y=0.002+0.028*x