30 60 90 120 0.0 0.1 0.2 0.3 0.4 On glass

Fraction (%)

Intensity

30 60 90 120

On membrane

Intensity

400 500 600 700 800 1 2 3 4

Extinction (a.u.)

Wavelength (nm)

CTAB@AuNRs C B A