A B

0.0 2.5 5.0

0 45 90

100 200 300 0.0 0.2 0.4

Moving

Dis. (μm)

Polar R_g (μm)

Time (s)

23 24 25 26 27 28 21 22 23 24 25 26

Y (μm)

X (μm)

Moving

0 50 100 150 200 250 300

0.0 0.4 0.8 4.8 5.0

0 45 90

100 200 300 0.0 0.2 0.4

Dis. (μm)

Polar R_g (μm)

Time (s)

Confined

40 41 42 43 44 45 45 46 47 48 49 50

Y (μm)

X (μm)

Confined

0 50 100 150 200 250 300 A

D C