0 20 40 60 80 100 0

500

1000

1500

2000

2500

3000

3500

Realistic oxygen concentration

16O^- / ^{69}Ga^- signals ratio (a.u.)

1/J_{pr} (a.u.)

Vacuum background contribution = 95% of total number of counts