10^0 10^1 10^2 10^3

10^1

10^2

10^3

10^4

10^5

10^6

Recombinant MeCP2 [ng/mL]

Signal

200

66,67

22,22

7,41

2,47

0,82

600 1800

LLOD ULOD

Standard 1 Standard 2 Standard 3 Standard 4 Standard 5