1x 0.5x 0.25x

0.1x 0.01x

0

50

100

VLP Dilution

% of VLP bound E. cloacae

1x 0.5x

0.25x 0.1x 0.01x

0

50

100

VLP Dilution

% of VLP bound L. gasseri

A

B