0 10 20 30 40 50 60 70 80 90 100 110 120 130

-1.0

-0.8

-0.6

-0.4

-0.2 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 (c)

Dimensionless vibration amplitude

Radial coordinate/ mm

Experimental results (250 mm plate C) ANSYS simulation (250 mm plate C)