-30 -20 -10 0 10 20 30

Current Density (mA/cm^2)

1.2 1.0 0.8 0.6 0.4 0.2 0.0 -0.2 Voltage (V)

0.50 �m CdSeTe/1.0 �m CdTe Illuminated Dark

1.25 �m CdSeTe/0.25 �m CdTe Illuminated Dark