PaCO_2

BLH

CPR

ROSC

1 h

0

20

40

60

80

Time Point

PaCO_2[mmHg]

Horovitz’s ratio

BLH

CPR

ROSC

1 h

0

200

400

600

PaO_2/F_iO_2

Time Point

A

B