Heart Rate

BLH CA CPR ROSC 1 h

0

50

100

150

200

Time Point

HR [beats per minute]

Mean Arterial Pressure

BLH CA CPR ROSC 1 h

0

50

100

150

Time Point

MAP[mmHg]

A

B