0 2 4 6 8 10 12 14 16 18 20 22

1. 0

1. 5

2. 0

Hour

2015 2016 2017

Congestion Delay Index

Hour

0 2 4 6 8 10 12 14 16 18 20 22

1. 0

1. 5

2. 0

Congestion Delay Index

(a)

(b)