0 10 20 30 40 0.0

0.1

0.2

0.3

HbF (%)

EImin (EI)

R=0.833 p<0.001

50 60 70 80 90 0.0

0.1

0.2

0.3

HbS (%)

EImin (EI)

R=-0.852 p<0.001

0 10 20 30 40 0 25 50 75 100 125

HbF (%)

PoS (mmHg)

R= -0.545 p= 0.035

50 60 70 80 90 0 25 50 75 100 125

HbS (%)

PoS (mmHg)

R= 0.574 p= 0.025

0 5 10 15 0.0

0.2

0.4

0.6

sickled cells at normoxia (%)

EImax (EI)

R=-0.596 p=0.019

A B

C D

E F

0 5 10 15 0.0

0.2

0.4

0.6

%DRBC

EImax (EI)

R = -0.943 P = <0.001