0 50 100 150 0.0

0.2

0.4

0.6

pO_2 (mmHg)

EI

EImin

EImax

Deoxygenation

Reoxygenation

PoS Representative Oxygenscan curve

Recovery dEI

Area

A

B

C

Oxygenated Deoxygenated