0 10 20 30 40 50 60 70

31.0

31.5

32.0

32.5

33.0

33.5

SST_3 SST_2

SST_1

V_3

V_2

Surface Tension Bubble Volume

Time (s)

Surface Tension (mN m^{-1})

V_1

1.5 2.0 2.5 3.0 3.5 4.0 4.5

Bubble Volume (mL)