b)

0 500 1000 1500 2000 0.0

0.2

0.4

0.6

0.8

1.0

1.2

Mt/M

Time (h)

CP4-80 CP6-80

0 500 1000 1500 2000 0.0

0.2

0.4

0.6

0.8

1.0

Amount of drug released (mg)

Time (min)

CP4-80 CP6-80

a)