-25 -20 -15 -10 -5 0 5 10 15 -25

-20

-15

-10

-5

0

5

10

15

NEP_{FCRN} (μmol m^2 s^{- 1})

NEP REddyProc

(μmol m 2 s-1) y=0.9x-0.03 r^2=0.89

1:1