5 10 15 20 25 30 35 40 45 50 FID Number

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Normalized Signal Amplitude

Sequence of FIDs

0 50 100 150 200 Time [ s]

0.45 0.5 0.55 0.6 0.65

Normalized Amplitude

7th FID