93.80 93.85 93.90 93.95 94.00 94.05 94.10 94.15 94.20 94.25 94.30 Microwave Frequency [GHz] 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

Amplitude [A.U.]

94.128

8200

8400

8600