    0 2 4 6 8 10 12
                                           Time in ms

  0.1

  0.2

1 mm

  0.3

  0.4

  0.5

  0.6

  0.7

  0.8

  0.9

   1

Output Voltage in V

                                                  Raw Signal

                                                                                                              10V
                                                                                                              9V
                                                                                                              8V
                                                                                                              7V
                                                                                                              6V
                                                                                                              5V
                                                                                                              4V
                                                                                                              3V
                                                                                                              2V
                                                                                                              1V
                                                                                                              0V

                                                                       Membrane
                                                                       approaches
                                                                       the sensor

                                                 Membrane
                                                 departes from
                                                 the sensor

Sensor
Mount
Position