  0 0.5 1 1.5 2

-5

 0

 5

10

15

20

Height in m

                 Aluminium

                                                        0 0.5 1 1.5 2

                                                       -2

                                                       0

                                                       2

                                                       4

                                                       6

                                                       8

                                                      10

                                                                   Titanium

  0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2
                                       Tip Position in mm

-30

-20

-10

 0

 10

 20

Height in m

Alumina-based