  0 0.5 1 1.5 2

-20

-15

-10

 -5

 0

 5

 10

 15

Height in m

Silver

                                   0 0.5 1 1.5 2

                                 -40

                                 -30

                                 -20

                                 -10

                                  0

                                 10

                                 20

                                 30

                                                Copper

0 0.5 1 1.5 2 Tip Position in mm -10 -5 0 5 10 15 20 25

Height in m

Bronze

0 0.5 1 1.5 2 Tip Position in mm -20 -10 0 10 20 30 40 Brass