0 20 40 60 80 100 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0 2.2

Stress (MPa)

Strain (%)

PSU-3T PSU-6T PSU-9T PSU-12T PSU-15T PSU-18T PSU-23T PSU-26T PSU-31T PSU-33T