[GeV] 0m 500 1000 1500 2000 2500

[GeV] 1/2 m

200

300

400

500

600 >0 μ = -500, 0 = 40, A β mSUGRA: tan

(600 GeV) q̃

(1000 GeV) q̃

(1400 GeV) q̃

(600 GeV) g̃

(800 GeV) g̃

(1000 GeV) g̃

(1200 GeV) g̃

delimiter

=7 TeV s , -1 = 1.04 fb intL

SM-based limit (Eq. 1) SM-based limit (Eq. 3)

SM-based limit (Eq. 4) SM-based limit (Eq. 5)

[GeV] 0m 500 1000 1500 2000 2500

[GeV] 1/2 m

200

300

400

500

600 >0 μ = 500, 0 = 20, A β mSUGRA: tan

(600 GeV) q̃

(1000 GeV) q̃

(1400 GeV) q̃

(600 GeV) g̃

(800 GeV) g̃

(1000 GeV) g̃

(1200 GeV) g̃

delimiter

=7 TeV s , -1 = 1.04 fb intL

SM-based limit (Eq. 1) SM-based limit (Eq. 3)

SM-based limit (Eq. 4) SM-based limit (Eq. 5)