[GeV] 0m 500 1000 1500 2000 2500 3000 3500

[GeV] 1/2 m

200

300

400

500

600

(600) g̃

(800) g̃

(1000) g̃

(1200) g̃

(600) q̃

(1000) q̃

(1400) q̃

>0 μ = 0, 0 = 10, A β MSUGRA/CMSSM: tan

=7 TeV s, ^{-1} L dt = 1.04 fb ∫ 0 lepton 2011 combined

ATLAS^{0 lepton 2011 combined} 1 ±χ∼ LEP2 -1 <0, 2.1 fb μ =3, β , tan q̃,g̃ D0 -1 <0, 2 fb μ =5, β , tan q̃,g̃ CDF Theoretically excluded observed 95% C.L. limit sCL median expected limit sCL σ1± Expected limit Reference point 2010 data PCL 95% C.L. limit

[GeV] 0m 500 1000 1500 2000 2500

[GeV] 1/2 m

200

300

400

500

600 >0 μ = 0, 0 = 10, A β mSUGRA: tan

(600 GeV) q̃

(1000 GeV) q̃

(1400 GeV) q̃

(1600 GeV) q̃

(600 GeV) g̃

(800 GeV) g̃

(1000 GeV) g̃

(1200 GeV) g̃

delimiter

=7 TeV s , -1 = 1.04 fb intL_1^±χ∼

LEP2

Observed limit^{-1} <0, 2.1 fb μ =3, β , tan q̃,g̃ D0 Median expected limit^{-1} <0, 2 fb μ =5, β , tan q̃,g̃ CDF