[GeV] 0m 200 400 600 800 100012001400160018002000

[GeV] 1/2 m

150 200 250 300 350 400 450 500 550 600

0 10 20 30 40 50 60 70 80 90 100

(400 GeV) q̃

(1000 GeV) q̃

(1600 GeV) q̃

(400 GeV) g̃

(800 GeV) g̃

(1200 GeV) g̃

> 0 μ = 10, β = 0, tan 0A

[GeV] 0m 400 600 800 1000 1200 1400 1600 1800 2000

[GeV] 1/2 m

150 200 250 300 350 400 450 500 550 600

0 10 20 30 40 50 60 70 80 90 100

(400 GeV) q̃

(1000 GeV) q̃

(1600 GeV) q̃

(400 GeV) g̃

(800 GeV) g̃

(1200 GeV) g̃

> 0 μ = 40, β = -500, tan 0A