[GeV]

gluino m 300 400 500 600 700 800

[GeV] LSP m

0 100 200 300 400 500 600 700 800

Efficiency × Acceptance

-5 10

-4 10

-3 10

-2 10

-1 10 1-Step Decay, x=1/4 0 1χ∼^0_1χ∼ qqqqWW →g̃g̃ 3jL μ SR:

ATLAS Simulation

[GeV] g̃m 300 400 500 600 700 800

[GeV] LSP m

0 100 200 300 400 500 600 700 800

Efficiency × Acceptance

-5 10

-4 10

-3 10

-2 10

-1 10

×

1-Step Decay, x=1/4_0 1χ∼ qqW →g̃ Production, g̃g̃ 3 jets, loose SR ≥ 1 muon,

=7 TeV, MadGraph+Pythia+PGS s