1562.0 1562.1 1562.2 0.6 0.8 1.0 1.2 1.4 1.6 1.8

= 1562.164 Q = 43855 q = -0.0003

= 1562.161 Q = 32052 q = 1.37

= 1562.156 Q = 41382 q = -0.0891

= 1562.156 Q = 43639 q = -1.845

(b)

1562.0 1562.1 1562.2 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0 2.2 (a)

1562.0 1562.1 1562.2

0.70

0.75

0.80

0.85

0.90

0.95 (d)

Wavelength

(nm)

Voltage (V)

1562.0 1562.1 1562.2

0.06

0.08

0.10

0.12

0.14

0.16 (c)